/*
 Navicat Premium Data Transfer

 Source Server         : cold_baota
 Source Server Type    : MySQL
 Source Server Version : 80025 (8.0.25-220701)
 Source Host           : 127.0.0.1:40306
 Source Schema         : cold

 Target Server Type    : MySQL
 Target Server Version : 80025 (8.0.25-220701)
 File Encoding         : 65001

 Date: 13/09/2024 09:22:16
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for api
-- ----------------------------
DROP TABLE IF EXISTS `api`;
CREATE TABLE `api` (
  `ID` int NOT NULL AUTO_INCREMENT,
  `t__menu__id` int DEFAULT NULL,
  `t_name` varchar(256) CHARACTER SET utf8 COLLATE utf8_general_ci DEFAULT NULL,
  `t_uri` varchar(256) CHARACTER SET utf8 COLLATE utf8_general_ci DEFAULT NULL,
  `t_method` varchar(256) CHARACTER SET utf8 COLLATE utf8_general_ci DEFAULT NULL,
  `t_enable` int NOT NULL DEFAULT '1',
  PRIMARY KEY (`ID`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=281 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci ROW_FORMAT=DYNAMIC;

-- ----------------------------
-- Records of api
-- ----------------------------
BEGIN;
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (1, 2, '权限列表', '/Power/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (2, 3, '查询权限', '/Power/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (3, 4, '添加权限', '/Power/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (4, 4, '权限列表', '/Power/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (5, 4, '报警类型列表', '/WarningType/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (6, 4, '菜单列表', '/Menu/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (7, 5, '编辑权限', '/Power/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (8, 5, '查询权限', '/Power/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (9, 6, '删除权限', '/Power/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (10, 7, '报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (11, 7, '报警类型列表', '/WarningType/Power_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (12, 8, '批量处理', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (13, 9, '编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (14, 10, '删除报警', '/DeviceWarning/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (15, 11, '处理记录', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (16, 12, '内部用户列表', '/Admin/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (17, 13, '添加内部用户', '/Admin/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (18, 13, '权限所有列表', '/Power/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (19, 14, '编辑内部用户', '/Admin/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (20, 14, '权限所有列表', '/Power/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (21, 15, '删除内部用户', '/Admin/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (22, 16, '已绑定公司列表', '/Admin/CompanyBind_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (23, 16, '公司列表', '/Company/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (24, 16, '添加公司绑定', '/Admin/CompanyBind_Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (25, 16, '删除公司绑定', '/Admin/CompanyBind_Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (26, 17, '设备版本列表', '/ProductUpgrade/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (27, 17, '设备版本产品型号列表', '/ProductUpgrade/T_model_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (28, 18, '添加设备版本', '/ProductUpgrade/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (29, 19, '删除设备版本', '/ProductUpgrade/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (30, 21, '用户绑定公司列表', '/Company/Tree', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (31, 22, '添加公司', '/Company/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (32, 23, '添加分公司', '/Company/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (33, 24, '编辑公司', '/Company/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (34, 25, '删除公司', '/Company/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (35, 27, '用户列表', '/User/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (36, 28, '添加用户', '/User/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (37, 28, '权限所有列表', '/Power/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (38, 29, '编辑用户', '/User/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (39, 29, '权限所欲列表', '/Power/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (40, 30, '删除用户', '/User/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (41, 32, '设备列表', '/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (42, 32, '传感器列表', '/DeviceSensor/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (43, 33, '添加设备', '/Device/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (44, 39, '设备类型所有列表', '/DeviceSensorType/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (45, 34, '设备参数列表', '/Device/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (46, 101, '设备参数列表', '/Device/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (47, 102, '修改设备参数', '/Device/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (48, 103, '获取设备', '/Device/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (49, 105, '删除设备', '/Device/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (50, 107, '同步传感器', '/Device/Read_DeviceSensorParameter', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (51, 31, '设备参数记录', '/Device/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (52, 36, '传感器列表', '/DeviceSensor/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (53, 37, '传感器列表', '/DeviceSensor/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (54, 38, '修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (55, 39, '修改传感器', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (60, 45, '传感器参数列表', '/DeviceSensor/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (61, 46, '设备日志', '/Device/Log', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (62, 47, '设备重启/关机', '/Device/RestartShutdown', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (63, 48, '报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (64, 48, '报警类型列表', '/WarningType/Power_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (65, 49, '编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (66, 50, '编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (67, 51, '删除报警', '/DeviceWarning/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (68, 52, '报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (69, 53, '设备报警导出Excel', '/DeviceWarning/ToExcel', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (70, 54, '设备分类列表', '/Class/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (71, 55, '添加设备分类', '/Class/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (72, 56, '编辑设备分类', '/Class/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (73, 57, '删除设备分类', '/Class/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (74, 58, '已绑定设备分类传感器列表', '/Device/DeviceClassBind_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (75, 58, '设备列表', '/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (76, 58, '传感器列表', '/DeviceSensor/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (77, 58, '添加设备分类绑定', '/Class/Bind_Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (78, 58, '删除设备分类绑定', '/Class/Bind_Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (79, 61, '报警策略列表', '/Notice/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (80, 62, '添加报警策略', '/Notice/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (81, 63, '编辑报警策略', '/Notice/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (82, 63, '报警通知用户列表', '/Notice/User_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (83, 64, '删除报警策略', '/Notice/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (84, 65, '已绑定报警策略的传感器列表', '/Device/DeviceNoticeBind_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (85, 65, '设备列表', '/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (86, 65, '传感器列表', '/DeviceSensor/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (87, 65, '添加报警策略绑定', '/Notice/Bind_Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (88, 65, '删除报警策略绑定', '/Notice/Bind_Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (89, 69, '传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (90, 69, '设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (91, 70, '传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (92, 70, '设备数据列表', '/Data/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (93, 70, '设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (94, 71, '设备数据导出Excel', '/Data/Excel', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (95, 72, '设备数据下载PDF', '/Data/PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (96, 73, '传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (97, 73, '设备数据列表', '/Data/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (98, 73, '设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (99, 74, '传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (100, 74, '设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (101, 79, '用户工单列表', '/WorkOrder/User_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (102, 80, '添加工单', '/WorkOrder/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (103, 81, '查询工单', '/WorkOrder/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (104, 82, '编辑工单', '/WorkOrder/Up', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (105, 83, '工单列表', '/WorkOrder/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (106, 84, '查询工单', '/WorkOrder/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (107, 85, '删除工单', '/WorkOrder/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (108, 86, '个人信息', '/User/Info', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (109, 86, '修改个人信息', '/User/Post', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (110, 88, '系统日志', '/System/LogsList', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (111, 88, '系统日志分类', '/System/LogsClass', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (112, 89, '用户日志', '/System/UserLogsClass', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (113, 89, '用户日志分类', '/System/UserLogsList', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (114, 91, '订单列表', '/GoodsOrder/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (115, 92, '添加订单', '/GoodsOrder/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (116, 93, '编辑订单', '/GoodsOrder/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (117, 94, '删除订单', '/GoodsOrder/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (118, 95, '下载PDF', '/GoodsOrder/PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (119, 108, '传感器列表', '/DeviceSensor/Manage_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (120, 109, '修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (121, 110, '修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (122, 111, '修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (123, 112, '修改传感器参数', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (124, 26, '进入公司', '/Company/Entry', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (125, 113, '版本升级列表', '/ProductUpgrade/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (126, 114, '设备版本升级', '/Device/ProductUpgrade', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (127, 118, '修改设备', '/Device/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (128, 120, '修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (142, 65, '传感器类型列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (143, 57, '传感器类型列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (144, 63, '获取报警策略', '/Notice/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (145, 106, '远程启停', '/Device/DeviceTask_Post', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (146, 74, '任务列表', '/Device/DeviceTask_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (147, 74, '传感器数据', '/Data/Device_Sensor_Data', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (148, 32, '获取设备', '/Device/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (149, 121, '设备数据备份列表', '/Data/BackUp', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (150, 121, '数倍数据备份PDF', '/Data/BackUp_PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (151, 117, '流量池', '/Flow_Pool', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (152, 63, '重置报警策略通知机制', '/Notice/Reset_Mechanism', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (153, 122, '执行数据源', '/DataSource', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (154, 122, '数据源列表', '/DataSource/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (155, 122, '添加数据源', '/DataSource/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (156, 122, '修改数据源', '/DataSource/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (157, 122, '删除数据源', '/DataSource/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (158, 123, '小程序-报警-传感器列表', '/DeviceWarning/DeviceSensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (159, 123, '小程序-主机列表', '/Device/Applet_Stat_View2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (160, 123, '小程序-传感器列表-view1', '/DeviceSensor/Applet_List_View1', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (161, 123, '小程序-传感器列表-view2', '/DeviceSensor/Applet_List_View2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (162, 123, '小程序-传感器类型列表', '/DeviceSensorType/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (164, 123, '小程序-数据打印', '/Data/DeviceSensor_Data_Print', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (165, 123, '小程序-公司列表', '/Company/Tree', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (166, 123, '小程序-任务列表', '/Device/DeviceTask_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (167, 123, '小程序-进入公司', '/Company/Entry', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (168, 123, '小程序-添加设备', '/Device/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (169, 37, '传感器类型列表', '/DeviceSensorType/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (170, 123, '小程序-获取设备', '/Device/Applet_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (171, 124, '公司数字孪生', '/Company/DigitalTwin', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (172, 125, '公司报警统计', '/Company/Warning', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (173, 126, '公司充值', '/Company/Pay', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (174, 128, '设备报警率列表', '/WarningRate/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (175, 129, '设备报警率列表', '/WarningRate/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (176, 128, '管理员用户列表', '/Admin/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (177, 74, '最新一条任务数据', '/Data/Device_Sensor_Data_Real', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (178, 130, '公司报警列表', '/CompanyWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (179, 130, '报警类型列表', '/WarningType/Power_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (180, 131, '编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (181, 132, '编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (182, 133, '删除报警', '/DeviceWarning/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (183, 134, '报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (184, 135, '设备报警导出Excel', '/CompanyWarning/ToExcel', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (185, 136, '传感器列表', '/Data/Company_Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (186, 136, '设备分类列表', '/Class/Company_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (187, 137, '已绑定主机列表', '/User/Bind_Device_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (188, 137, '未绑定主机列表', '/User/Unbind_Device_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (189, 137, '用户绑定主机', '/User/Bind_Device', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (190, 137, '用户解绑主机', '/User/Unbind_Device', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (191, 73, '图表展示下载PDF', '/Data/ChartShow_PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (192, 215, '公司记账扣费', '/Company/Pay', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (193, 216, '同步主机参数', '/Device/Parameter_Sync', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (194, 217, '修改传感器参数', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (195, 91, '设备列表', '/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (196, 219, '动环控制-设备管理列表', '/Cold_Monitor/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (197, 219, '动环控制-添加设备管理', '/Cold_Monitor/Device/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (198, 219, '动环控制-修改设备管理', '/Cold_Monitor/Device/Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (199, 219, '动环控制-删除设备管理', '/Cold_Monitor/Device/Delete', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (200, 219, '动环控制-控制组列表', '/Cold_Monitor/ControlGroup/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (201, 219, '动环控制-添加控制组', '/Cold_Monitor/ControlGroup/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (202, 219, '动环控制-编辑控制组', '/Cold_Monitor/ControlGroup/Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (203, 219, '动环控制-删除控制组', '/Cold_Monitor/ControlGroup/Delete', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (204, 220, '冷链运输物流-订单列表', '/clodLogistic/api/v1/manage/order/page', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (205, 220, '冷链运输物流-订单详情', '/clodLogistic/api/v1/manage/order/detail', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (206, 220, '冷链运输物流-物流详情', '/clodLogistic/api/v1/manage/order/logistic', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (207, 220, '冷链运输物流-派单', '/clodLogistic/api/v1/manage/order/assign', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (208, 220, '冷链运输物流-仓库列表', '/clodLogistic/api/v1/manage/warehouse/page', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (209, 220, '冷链运输物流-添加仓库', '/clodLogistic/api/v1/manage/warehouse/add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (210, 220, '冷链运输物流-修改仓库', '/clodLogistic/api/v1/manage/warehouse/update', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (211, 220, '冷链运输物流-仓库订单', '/clodLogistic/api/v1/manage/warehouse/orderPage', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (212, 220, '冷链运输物流-车辆列表', '/clodLogistic/api/v1/manage/car/page', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (213, 220, '冷链运输物流-添加车辆', '/clodLogistic/api/v1/manage/car/add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (214, 220, '冷链运输物流-修改车辆', '/clodLogistic/api/v1/manage/car/update', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (215, 220, '冷链运输物流-既往司机', '/clodLogistic/api/v1/manage/car/driverLog', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (216, 220, '获取进入后的公司详情', '/Company/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (217, 123, '远程启停', '/Device/DeviceTask_Post', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (218, 130, '公司报警列表2', '/CompanyWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (219, 7, '报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (220, 11, '处理记录2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (221, 48, '报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (222, 52, '报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (223, 134, '报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (224, 53, '设备报警导出Excel2', '/DeviceWarning/ToExcel2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (225, 135, '设备报警导出Excel2', '/CompanyWarning/ToExcel2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (230, 231, '弃用设备-设备列表', '/Device/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (231, 231, '弃用设备-传感器列表', '/DeviceSensor/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (232, 232, '弃用设备-添加设备', '/Device/Add', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (233, 239, '弃用设备-设备类型所有列表', '/DeviceSensorType/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (234, 233, '弃用设备-设备参数列表', '/Device/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (235, 234, '弃用设备-设备参数列表', '/Device/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (236, 280, '弃用设备-修改设备参数', '/Device/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (237, 281, '弃用设备-获取设备', '/Device/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (238, 230, '弃用设备-设备参数记录', '/Device/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (239, 236, '弃用设备-传感器列表', '/DeviceSensor/Parameter_Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (240, 237, '弃用设备-传感器列表', '/DeviceSensor/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (241, 238, '弃用设备-修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (242, 239, '弃用设备-修改传感器', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (243, 245, '弃用设备-传感器参数列表', '/DeviceSensor/Parameter_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (244, 246, '弃用设备-设备日志', '/Device/Log', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (245, 247, '弃用设备-设备重启/关机', '/Device/RestartShutdown', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (246, 248, '弃用设备-报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (247, 248, '弃用设备-报警类型列表', '/WarningType/Power_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (248, 249, '弃用设备-编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (249, 250, '弃用设备-编辑报警', '/DeviceWarning/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (250, 251, '弃用设备-删除报警', '/DeviceWarning/Del', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (251, 252, '弃用设备-报警列表', '/DeviceWarning/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (252, 253, '弃用设备-设备报警导出Excel', '/DeviceWarning/ToExcel', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (253, 270, '弃用设备-传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (254, 270, '弃用设备-设备数据列表', '/Data/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (255, 270, '弃用设备-设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (256, 271, '弃用设备-设备数据导出Excel', '/Data/Excel', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (257, 272, '弃用设备-设备数据下载PDF', '/Data/PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (258, 273, '弃用设备-传感器列表', '/Data/Device_Sensor_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (259, 273, '弃用设备-设备数据列表', '/Data/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (260, 273, '弃用设备-设备分类列表', '/Class/All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (261, 283, '弃用设备-传感器列表', '/DeviceSensor/Manage_List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (262, 292, '弃用设备-修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (263, 293, '弃用设备-修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (264, 294, '弃用设备-修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (265, 295, '弃用设备-修改传感器参数', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (266, 284, '弃用设备-版本升级列表', '/ProductUpgrade/List', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (267, 291, '弃用设备-设备版本升级', '/Device/ProductUpgrade', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (268, 285, '弃用设备-修改设备', '/Device/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (269, 287, '弃用设备-修改传感器参数', '/DeviceSensor/Parameter_Pu', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (270, 282, '弃用设备-远程启停', '/Device/DeviceTask_Post', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (271, 231, '弃用设备-获取设备', '/Device/Get', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (272, 288, '弃用设备-设备数据备份列表', '/Data/BackUp', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (273, 288, '弃用设备-数倍数据备份PDF', '/Data/BackUp_PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (274, 237, '弃用设备-传感器类型列表', '/DeviceSensorType/List_All', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (275, 273, '弃用设备-图表展示下载PDF', '/Data/ChartShow_PDF', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (276, 290, '弃用设备-同步主机参数', '/Device/Parameter_Sync', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (277, 296, '弃用设备-修改传感器参数', '/DeviceSensor/Edit', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (278, 248, '弃用设备-报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (279, 252, '弃用设备-报警列表2', '/DeviceWarning/List2', 'POST', 1);
INSERT INTO `api` (`ID`, `t__menu__id`, `t_name`, `t_uri`, `t_method`, `t_enable`) VALUES (280, 253, '弃用设备-设备报警导出Excel2', '/DeviceWarning/ToExcel2', 'POST', 1);
COMMIT;

SET FOREIGN_KEY_CHECKS = 1;
